เลือกหลอดไฟ led 12v สำหรับระบบโซล่าเซลล์แบบไหน ส่งผลดีที่สุดต่อรูปแบบในการใช้งาน

การเลือกใช้หลอดไฟสำหรับระบบโซล่าเซลล์นั้น หลอดไฟที่ถือว่าเหมาะสมและใช้งานได้อย่างเต็มประสิทธิภาพกับงานโซล่าเซลล์ คงต้องยกให้ หลอดไฟ led 12v เพราะหลอดไฟประเภทนี้ได้รับการออกแบบมาให้สามารถใช้งานกับแหล่งพลังงานไฟฟ้าที่ได้จากแบตเตอรี่หรือระบบโซล่าเซลล์โดยเฉพาะ จึงมีคุณสมบัติพิเศษในเรื่องการประหยัดพลังงาน สามารถประหยัดไฟฟ้าได้สูงสุดถึง 50% ให้ความสว่างสูงและมีอายุในการใช้งานยาวนานถึง 50,000 ชั่วโมง ที่สำคัญคือปลอดภัยจากสารปรอทและรังสียูวี เนื่องจากหลอดประเภทนี้จะไม่ปล่อยรังสียูวีออกมาในขณะที่ให้แสงสว่างนั่นเอง

หลอดไฟ led 12v ประเภทต่างๆ และความเหมาะสมในการใช้งาน

สำหรับการเลือกใช้งานหลอดไฟ led 12v ในปัจจุบันนั้น ถือว่ามีความหลากหลายมากขึ้น เนื่องจากผู้ผลิตมีความตั้งใจให้ผู้ใช้งานสามารถเลือก หลอดไฟ led 12v ได้อย่างเหมาะสมกับความต้องการในการใช้งานและมีประสิทธิภาพสูงสุด ส่งผลให้หลอดไฟ led 12v มีรูปแบบที่หลากหลายตามไปด้วย ดังนั้น เราลองมาดูกันสิว่า มีหลอดไฟ led 12v แบบไหนบ้างให้เราเลือกใช้งาน

1.หลอดไฟ led 12v 3528 E27 3W 24SMD แสงสีขาวอมเหลือง

เป็นหลอดไฟที่ผลิตจากวัสดุอลูมิเนียมกับพลาสติก ให้แรงดันไฟฟ้าอยู่ที่ 12VDC ค่าความสว่างอยู่ที่ 240-270 Lumen มีมุมการส่งสว่างถึง 180 องศา และที่สำคัญมีอายุในการใช้งานยาวนานกว่า 40,000 ชั่วโมง ให้แสงสีขาวอมเหลือง เหมาะสมอย่างยิ่งสำหรับการใช้งานกับระบบโซล่าเซลล์

2.หลอดไฟ led 12v E27 12VDC 27 leds smd 5730 led light bulb แสงสีขาวสำหรับระบบโซล่าเซลล์

เป็นหลอดไฟที่ผลิตจากวัสดุอลูมิเนียมกับพลาสติก ให้แรงดันไฟฟ้าอยู่ที่ 12VDC ค่าความสว่างอยู่ที่ 90-100 Lumen มีมุมการส่งสว่างถึง 180 องศา และสามารถใช้งานยาวนานกว่า 40,000 ชั่วโมงเช่นกัน แต่ให้แสงสีขาว

3.หลอดไฟ led 12v E27 12VDC 27leds smd 5730 White light Globe Bulb แสงสีขาว

เป็นหลอดไฟที่ผลิตจากวัสดุอลูมิเนียมกับพลาสติก ให้แรงดันไฟฟ้าอยู่ที่ 12VDC ค่าความสว่างอยู่ที่ 240-270 Lumen มีมุมการส่งสว่างถึง 180 องศา มีอายุในการใช้กว่า 40,000 ชั่วโมง ให้แสงสีขาว

4.หลอดไฟ led 12v หลอดกลม 3W E27 High power 12V 300LM LED Light Bulbs Lamp Lighting แสงสีขาวอมเหลือง

เป็นหลอดไฟประเภท Bubble Ball Bulb ให้แรงดันไฟฟ้าอยู่ที่ 12V ค่าความสว่างอยู่ที่ 300 Lumen มีมุมการส่งสว่างถึง 180 องศา ซึ่งความพิเศษของหลอดไฟประเภทนี้ คือ ประหยัดพลังงานหว่าหลอดไฟทั่วไป 2 – 4 เท่า ไม่มีรังสี UV และมีอายุการใช้งานนานกว่า 50,000 ชั่วโมง

5.หลอดไฟ led 12v หลอดกลม 7W E27 5630SMD 12V 630LM Aluminum shell LED bulb light แสงสีขาว

เป็นหลอดไฟประเภท Bubble Ball Bulb ให้แรงดันไฟฟ้าอยู่ที่ 12V ค่าความสว่างอยู่ที่ 630 Lumen มีมุมการส่งสว่าง 120 องศา ไม่มีรังสี UV ประหยัดไฟมากกว่า 2 – 4 เท่าและมีอายุในการใช้งานยาวนานกว่า 50,000 ชั่วโมง

และทั้งหมดนี้ เป็นตัวอย่างของหลอดไฟ led ประเภทต่างๆ ที่นิยมนำมาใช้งานกับระบบโซล่าเซลล์ แต่ละประเภท ซึ่งสามารถนำมาใช้งานแทนหลอดไฟตามบ้านทั่วไปได้ทันที ซึ่งจะแตกต่างกันในลักษณะของการส่องแสง เพราะในจุดนี้ผู้ใช้งานอาจจำเป็นต้องพิจารณาและเลือกให้เหมาะสมที่สุดกับความต้องการในการใช้งาน เพื่อประสิทธิภาพที่ดีอย่างที่ตั้งใจ